This is the file which will be sent in reply to a FNDFIL request which has
produced a satisfactory response.

This file should provide help to the user to enable him to understand
how to obtain the file(s) he requires.

If this file is not present, a default response contained within the
program FNDFIL.EXE will be sent.

VERY IMPORTANT
==============
Ensure that this file does not contain any embedded WP control codes or
end with a CONTROL Z.


